;
; module definition file for XSYSTRAY.DLL, an XCenter
; plug-in widget DLL.
;

LIBRARY XSYSTRAY INITGLOBAL TERMGLOBAL
Description '@#netlabs.org:0.1.0#@ Extended system tray widget DLL for XCenter'
PROTMODE

DATA              MULTIPLE READWRITE LOADONCALL NONSHARED
;       doesn't really matter, because the widget is only ever used
;       in the WPS process; we use MULTIPLE NONSHARED here to reduce
;       the amount of shared memory that is needed for the DLL

CODE              LOADONCALL

EXPORTS
    WgtInitModule      @1
    WgtUnInitModule    @2
    WgtQueryVersion    @3
